Dec11 Jan12 Feb12 Mar12 Apr12 May12 Jun12 Jul12 Aug12

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 U (m/s) at -175E, 38.9669N

-0.5 m -171.825 m

Dec11 Jan12 Feb12 Mar12 Apr12 May12 Jun12 Jul12 Aug12

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 V (m/s) at -174.9583E, 38.9968N

-0.5 m -171.825 m