0 10 20 30 40 50 60 -50

0

50

days from November 1, 2011 cm

Bottom pressure Sea surface height

0 10 20 30 40 50 60

-0.3

-0.2

-0.1 0 0.1 0.2 0.3

days from November 1, 2011 oC

Bottom temperature * 100 Depth-averaged temperature