Longitude East (deg)

Latitude Northg (deg)

Simulated surface salinity (g/kg) on 29-Nov-2011

-132 -130 -128 -126 -124 -122 -120 -118 -116

32

34

36

38

40

42

44

32.2

32.4

32.6

32.8

33

33.2

33.4

33.6

33.8 34

34.2