Longitude East (deg)

Latitude Northg (deg)

Simulated surface temperature (deg C) on 29-Nov-2011

-132 -130 -128 -126 -124 -122 -120 -118 -116

32

34

36

38

40

42

44

10

11

12

13

14

15

16

17

18